<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    &lt;testcasename&gt; : BUG#&lt;xxxx&gt; &lt;date disabled&gt; &lt;disabler&gt; &lt;comment&gt;
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
ndb_autodiscover         : BUG#18952 2006-02-16 jmiller Needs to be fixed w.r.t binlog
ndb_autodiscover2        : BUG#18952 2006-02-16 jmiller Needs to be fixed w.r.t binlog

# the below testcase have been reworked to avoid the bug, test contains comment, keep bug open
#ndb_autodiscover3        : bug#21806
#ndb_autodiscover3         : Bug#20872 2007-07-15 ingo master*.err: miscellaneous error messages
#rpl_ndb_extraColMaster   : BUG#30854 : Tables name show as binary in slave err msg on vm-win2003-64-b and Solaris
#rpl_ndb_mix_innodb       : Bug #32720   Test rpl_ndb_mix_innodb fails on SPARC and PowerPC
#rpl_ndb_dd_advance	 : Bug #30222  	rpl_ndb_dd_advance.test fails
</pre></body></html>