<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    &lt;testcasename&gt; : BUG#&lt;xxxx&gt; &lt;date disabled&gt; &lt;disabler&gt; &lt;comment&gt;
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

innodb_bug13635833: Disabled until merging with XtraDB 5.1.63

innodb_bug52745: Disabled as this has valgrind failures (also in MySQL 5.1.50)
innodb-index:    Disabled until merging with XtraDB 5.1.60
innodb-lock:     Disabled until merging with XtraDB 5.1.60
innodb_replace:  Disabled until merging with XtraDB 5.1.60
innodb-blob:     Disabled until merging with XtraDB 5.1.63
</pre></body></html>