<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    &lt;testcasename&gt; : BUG#&lt;xxxx&gt; &lt;date disabled&gt; &lt;disabler&gt; &lt;comment&gt;
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
user_limits     : Bug#23921 random failure of user_limits.test

concurrent_innodb        : BUG#21579 2006-08-11 mleich innodb_concurrent random failures with varying differences
ctype_big5               : BUG#26711 2007-06-21 Lars Test has never worked on Double Whopper

federated_transactions   : Bug#29523 Transactions do not work
events                   : Bug#32664 events.test fails randomly
events_scheduling        : Bug#29830 Test case 'events_scheduling' fails on Mac OS X and Windows
lowercase_table3         : Bug#32667 lowercase_table3.test reports to error log
kill                 : Bug#29149: Test "kill" fails on Windows
grant3               : Bug#32723: grant3.test fails
innodb_mysql         : Bug#32724: innodb_mysql.test fails randomly
wait_timeout         : Bug#32801 wait_timeout.test fails randomly
kill                 : Bug#29149 Test "kill" fails on Windows
</pre></body></html>